Restore Defaults
Click this button to restore the settings to their default values.


Job Owner
Selects how the job owner name is specified. This job owner is used when print job tabulation functions are used.


Job Owner
Displays the job owner name.

Use Login Name

Uses the Windows Login Name as a job owner name. The job owner name will become the Login User Name\Host Name. Up to 31 characters can be used for the login name. If it exceeds 31 characters, only the first 31 characters are used.

Enter Owner Name

Select this if you wish to specify a custom job owner name. Enter any job owner name in the Job Owner Name edit box. Up to 31 characters can be entered for the job owner name. If it exceeds 31 characters, only the first 31 characters are used. Its default value is UnknownUser.


Job Owner
Enter any job owner name in the Job Owner Name edit box. Up to 31 characters can be entered for the job owner name. If it exceeds 31 characters, only the first 31 characters are used. Its default value is Unknown User.


User ID
Displays the user ID for Secure Print or Sample Print.


User ID
Displays the user ID for Secure Print. Enter the user ID. Up to a maximum of 24 characters can be entered.


User ID
Displays the user ID for Secure Print. Enter the user ID. Up to a maximum of 24 characters can be entered.


Password
Displays the password for Secure Print. Enter the password with a maximum of four digits. Each input digit is represented by an asterisk.


Secure Print
The Secure Print feature allows you to send and store a print job at the printer. The job will not print until you retrieve it. You can select the settings after you have entered the User ID for Secure Print/Sample Print on the Configuration tab.


Secure Print
Select this to enable Secure Print. You can enter the settings after you have completed the User ID for Secure Print/Sample Print on the Configuration tab.


Displays the user ID entered in Secure Print User ID on the Configuration tab.


Displays the password for User ID entered in Secure Print User ID on the Configuration tab. Each input digit is represented by an asterisk.


Document Name
Displays the method of entering the document name. If you have selected Auto Retrieve, the document name will automatically be retrieved. The name can contain a maximum of 24 characters.

If you have selected Enter Document Name here, proceed to enter the name of the document in the Document Name text box. The name can contain a maximum of 24 characters.


Document Name
Displays the method of entering the document name. If you have selected Auto Retrieve, the document name will automatically be retrieved. The name can contain a maximum of 24 characters.

If you have selected Enter Document Name here, proceed to enter the name of the document in the Document Name text box. The name can contain a maximum of 24 characters.


Retrieve Document Name
If Enter Document Name is selected from the Retrieve Document Name list box, you can enter a document name of up to 24 characters.


Document Name
If Enter Document Name is selected from the Retrieve Document Name list box, you can enter a document name of up to 24 characters.


Enable EMF Spooling
Allows you to enter the spooling format of print data to the disk. If the check box is selected, data will be spooled in the EMF (metafile) format and the time to be released from the printing process will be short. If the check box is not selected, the data will be spooled in the RAW format. It is time consuming for print data conversion and thus it takes longer to be released from the printing process. However, if problems occur when the check box is selected, deselect it.


Details
Click this button to check the details of the printer driver version.


Secure Print/Sample Print
Displays the user ID for Secure Print or Sample Print as well as the password for Secure Print.


User ID
Allows you to enter the user ID for Secure Print or Sample Print. Up to a maximum of 24 characters can be entered.


Secure Print/Sample Print
The Secure Print feature allows you to send and store a print job at the printer. The job will not print until you retrieve it.

The Sample Print feature allows you to send a multiple-set print job to the printer for proofing. After you have verified that the document is all right, you can print the rest of the sets by selecting the Sample Print function on the printer.

You can select the following settings after you have entered the User ID for Secure Print/Sample Print on the Configuration tab.


Displays the user ID entered in Secure Print/Sample Print on the Configuration tab.


Displays the password entered in Secure Print/Sample Print on the Configuration tab. Each input digit is represented by an asterisk.


The Secure Print feature allows you to send and store a print job at the printer. The job will not print until you retrieve it.

The Sample Print feature allows you to send a multiple-set print job to the printer for proofing. After you have verified that the document is all right, you can print the rest of the sets by selecting the Sample Print function on the printer.

You can select the following settings after you have entered the User ID for Secure Print/Sample Print on the Configuration tab.

None

Select this when you do not want to enable either Secure Print or Sample Print.

Secure Print

Select this to enable Secure Print.

Sample Print

Select this to enable Sample Print.